# If a test request is received, a matching heartbeat should be sent

iCONNECT
I8=FIXT.1.135=A34=149=TW52=<TIME>56=ISLD98=0108=301137=9
E8=FIXT.1.19=6835=A34=149=ISLD52=00000000-00:00:00.00056=TW98=0108=301137=910=0

I8=FIXT.1.135=134=249=TW52=<TIME>56=ISLD112=HELLO
E8=FIXT.1.19=5935=034=249=ISLD52=00000000-00:00:00.00056=TW112=HELLO10=0

# logout message and response
I8=FIXT.1.135=534=349=TW52=<TIME>56=ISLD
E8=FIXT.1.19=4935=534=349=ISLD52=00000000-00:00:00.00056=TW10=0
eDISCONNECT