# We should expect heartbeats if we wait around

iCONNECT
I8=FIXT.1.135=A34=149=TW52=<TIME>56=ISLD98=0108=61137=9
E8=FIXT.1.19=6735=A34=149=ISLD52=00000000-00:00:00.00056=TW98=0108=61137=910=0

# Wait for quickfix to send a heartbeat to us
E8=FIXT.1.19=4935=034=249=ISLD52=00000000-00:00:00.00056=TW10=0

# we respond with a heartbeat
I8=FIXT.1.135=034=249=TW52=<TIME>56=ISLD

# we should get a heartbeat back
E8=FIXT.1.19=4935=034=349=ISLD52=00000000-00:00:00.00056=TW10=0

# we will send one more for good measure
I8=FIXT.1.135=034=349=TW52=<TIME>56=ISLD

# logout message and response
I8=FIXT.1.135=534=449=TW52=<TIME>56=ISLD
E8=FIXT.1.19=4935=534=449=ISLD52=00000000-00:00:00.00056=TW10=0
eDISCONNECT

