# If two logons with the same SenderCompID/TargetCompID combination logon
# the second one must be disconnected

# First logon, succesful
i1,CONNECT
I1,8=FIXT.1.135=A34=149=TW52=<TIME>56=ISLD98=0108=301137=8
E1,8=FIXT.1.19=6835=A34=149=ISLD52=00000000-00:00:00.00056=TW98=0108=301137=810=0

# Second logon, unsuccesful
i2,CONNECT
I2,8=FIXT.1.135=A34=149=TW52=<TIME>56=ISLD98=0108=301137=8

# wait for disconnect for second connection
e2,DISCONNECT
# force disconnect on first connection
i1,DISCONNECT