# SequenceReset where NewSeqNo is greater than the expected inbound MsgSeqNum

iCONNECT
I8=FIXT.1.135=A34=149=TW52=<TIME>56=ISLD98=0108=301137=7
E8=FIXT.1.19=6835=A34=149=ISLD52=00000000-00:00:00.00056=TW98=0108=301137=710=0

# sequence reset without gap fill flag (default to N)
I8=FIXT.1.135=434=049=TW52=<TIME>56=ISLD36=25
I8=FIXT.1.135=134=2549=TW52=<TIME>56=ISLD112=HELLO
E8=FIXT.1.19=5935=034=249=ISLD52=00000000-00:00:00.00056=TW112=HELLO10=0

# sequence reset with gap fill flag set to N
I8=FIXT.1.135=434=049=TW52=<TIME>56=ISLD36=50123=N
I8=FIXT.1.135=134=5049=TW52=<TIME>56=ISLD112=HELLO
E8=FIXT.1.19=5935=034=349=ISLD52=00000000-00:00:00.00056=TW112=HELLO10=0

# logout message and response
I8=FIXT.1.135=534=5149=TW52=<TIME>56=ISLD
E8=FIXT.1.19=4935=534=449=ISLD52=00000000-00:00:00.00056=TW10=0
eDISCONNECT
