# GapFill where MsgSeqNum is less than the expected inbound MsgSeqNum

iCONNECT
I8=FIX.4.035=A34=149=TW52=<TIME>56=ISLD98=0108=30
E8=FIX.4.09=5735=A34=149=ISLD52=00000000-00:00:0056=TW98=0108=3010=0

# sequence reset with gap fill flag set to Y, PosDupFlag set to Y
I8=FIX.4.035=434=149=TW52=<TIME>56=ISLD43=Y122=<TIME-1>36=20123=Y
I8=FIX.4.035=134=249=TW52=<TIME>56=ISLD112=HELLO
E8=FIX.4.09=5535=034=249=ISLD52=00000000-00:00:0056=TW112=HELLO10=0

# sequence reset with gap fill flag set to Y, PosDupFlag set to N
I8=FIX.4.035=434=149=TW52=<TIME>56=ISLD36=20123=Y
E8=FIX.4.09=9435=534=349=ISLD52=00000000-00:00:0056=TW58=MsgSeqNum too low, expecting 3 but received 110=0
eDISCONNECT